                                Pg. 1 of 1

User definable settings for mouse control on slower or faster computers.

SETTINGS: Mouse Button Delay Factor      (default 250)
          Sensitivity for X factor       (default 50)
          Sensitivity for Y factor       (default 50)
          Mouse double speed threshold   (default 2)

The default settings should work fine on most 386, 486, and Pentium
based systems. If you wish to SLOW DOWN the mouse DECREASE the values,
and INCREASE the values to SPEED UP the mouse.
